– 37 –

Cosmological Parameters ℓ: 2–20 (μK) ℓ: 100-200 (μK) ℓ: 700–1000 (μK) Ω_0 Ω_B z_{ri} T/S E T E B E T E B E T E B 1.0 0.05 0 0 0.02 (−)0.42 0 0.68 (+)3.6 0 3.7 (+)4.8 0 1.0 0.10 0 0 0.017 (−)0.40 0 0.71 (+)4.2 0 3.4 (+)3.3 0 1.0 0.05 5 0 0.03 (−)0.59 0 0.68 (+)3.6 0 3.7 (+)4.8 0 1.0 0.05 10 0 0.06 (−)0.78 0 0.68 (+)3.6 0 3.6 (+)4.8 0 1.0 0.05 20 0 0.14 (−)1.1 0 0.66 (+)3.5 0 3.5 (+)4.7 0 1.0 0.05 0 0.1 0.02 (−)0.40 0.01 0.65 (+)3.4 0.05 3.5 (+)4.6 0.01 0.4_K 0.05 0.1 0 0.01 (−)0.18 0 0.44 (+)2.3 0 2.8 (+)5.5 0 0.4_Λ 0.05 0 0 0.02 (−)0.37 0 0.65 (+)4.0 0 4.1 (+)6.4 0

Table 2: Bandpowers for a selection of cosmological models all with h = 0.5 and scale invariant spectra save for the T/S = 0.1 model where T/S = 7(1 − n_s). The low-Ω_0 models are indicated as 0.4_K for the open model and 0.4_Λ for the model with Ω_Λ = 1 − Ω_0 = 0.6. The bandpower is defined in units of the COBE quadrupole over the range of ℓ indicated. The sign of the cross correlation is indicated in parentheses and note that the band averaged signal may be suppressed from cancellation of correlated and anticorrelated angular regimes.